SQL Server Login - okno dialogowe

Mechanizm dostawcy OLE DB dla programu Microsoft® SQL Server™ wyświetla okno dialogowe Logowanie do Microsoft SQL Server przy próbie połączenia OLE DB bez podania wystarczających informacji dla sterownika do połączenia z serwerem SQL Server.

Na początku okno dialogowe Logowanie do Microsoft SQL Server zawiera jedynie:

Serwer - pole.

Użyj zaufanego połączenia - pole wyboru.

ID logowania - pole.

Hasło - pole.

OK, Anuluj, Pomoc i Opcje - przyciski.

Jeżeli naciśnięty zostanie przycisk Opcje, okno dialogowe rozwija się zawierając również:

Baza danych - pole

Język- pole

Nazwa aplikacji - pole

ID stacji roboczej - pole

Serwer - pole

Nazwa serwera SQL w sieci. Jeżeli jego nazwa została wybrana z listy, dalsza konfiguracja nie jest potrzebna. Jeżeli zostanie podana nazwa serwera, musi to być zaawansowany wpis dokonany przy użyciu narzędzia SQL Client Configuration lub nazwa sieciowa serwera, na którym działa program SQL Server.

Można wpisać wartość "(local)" do pola Server, jeżeli używany jest ten sam komputer, na którym uruchomiony jest żądany program SQL Server. Użytkownik może wtedy połączyć się z lokalną kopią programu SQL Server, nawet jeśli nie jest to wersja sieciowa.

Więcej informacji o nazwach serwerów dla różnych typów sieci znajduje się w dokumentacji instalacji programu SQL Server w podręcznikach programu SQL Server w trybie online.

Użyj zaufanego połączenia - pole wyboru

Zaznaczone, określa czy dostawca OLE DB dla programu SQL Server wymaga bezpiecznego (lub zaufanego) połączenia z programem SQL Server działającym na systemie Microsoft Windows NT®. Jeżeli pole jest zaznaczone, program SQL Server używa zintegrowanego bezpieczeństwa logowania do ustanawiania połączeń używając tego źródła danych, niezależnie od bieżącego trybu bezpieczeństwa logowania na serwerze. Ignorowany jest każdy identyfikator logowania i hasło. Administrator programu SQL Server musi skojarzyć Twój identyfikator sieciowy Microsoft Windows® z identyfikatorem logowania programu SQL Server.

Kiedy pole nie jest zaznaczone, program SQL Server używa standardowego bezpieczeństwa logowania do ustanawiania połączeń przy użyciu tego źródła danych. Należy podać identyfikator logowania i hasło dla wszystkich żądań połączenia.

ID logowania - pole

Określa identyfikator logowania programu SQL Server używany przy połączeniu, jeżeli nie jest zaznaczone pole Użyj zaufanego połączenia. Jeżeli zaznaczono pole Użyj zaufanego połączenia, pole ID logowania jest wyłączone.

Hasło - pole

Określa hasło dla identyfikatora logowania programu SQL Server używanego przy połączeniu, jeżeli nie jest zaznaczone pole Użyj zaufanego połączenia. Jeżeli zaznaczono pole Use Trusted Connection, pole Hasło jest wyłączone.

Baza danych - pole

Określa domyślną bazę danych używaną przy połączeniu. To ustawienie zastępuje domyślną bazę danych określoną dla logowania się do serwera. Jeżeli nie określono domyślnej bazy danych, połączenie używa domyślnej bazy danych określonej dla logowania się do serwera.

Język - pole

Określa język używany dla komunikatów systemowych programu SQL Server. Program SQL Server musi mieć zainstalowany ten język. To ustawienie zastępuje domyślny język ustawiony dla logowania się do serwera. Jeżeli nie określono języka, połączenie używa domyślnego języka określonego dla logowania się do serwera.

Nazwa aplikacji - pole

Opcjonalnie określa nazwę aplikacji przechowywaną w kolumnie program_name wiersza odpowiadającego temu połączeniu w master.dbo.sysprocesses.

ID stacji roboczej - pole

Opcjonalnie określa identyfikator stacji roboczej przechowywany w kolumnie hostname wiersza odpowiadającego temu połączeniu w master.dbo.sysprocesses.